0 0.5 1

-1.5

-1

-0.5

0

0.5

1 α,β= 0.50,0.000 ;μ^c= 1.0000

0 0.5 1 -1.5

-1

-0.5

0

0.5

1 α,β= 0.60,0.000 ;μ^c= 0.9091

0 0.5 1 -1.5

-1

-0.5

0

0.5

1 α,β= 0.50,0.417 ;μ^c= 0.5455

0 0.5 1 -1.5

-1

-0.5

0

0.5

1 α,β= 0.50,0.281 ;μ^c= 0.6401

Damping response of AB-3 :λ = 1.0 ;λ *dt= 0.0 -> 1.1 every 0.1