--- manual/s_phys_pkgs/text/shelfice.tex	2009/05/15 08:10:23	1.3
+++ manual/s_phys_pkgs/text/shelfice.tex	2011/12/01 11:59:46	1.5
@@ -1,4 +1,4 @@
-% $Header: /home/ubuntu/mnt/e9_copy/manual/s_phys_pkgs/text/shelfice.tex,v 1.3 2009/05/15 08:10:23 mlosch Exp $
+% $Header: /home/ubuntu/mnt/e9_copy/manual/s_phys_pkgs/text/shelfice.tex,v 1.5 2011/12/01 11:59:46 mlosch Exp $
 % $Name:  $
 
 \subsection{SHELFICE Package}
@@ -11,7 +11,7 @@
 
 %----------------------------------------------------------------------
 \subsubsection{Introduction
-\label{sec:pkg:exf:intro}}
+\label{sec:pkg:shelfice:intro}}
 
 
 Package ``shelfice'' provides a thermodynamic model for basal melting
@@ -56,14 +56,14 @@
 off, e.g.\ for KPP (\ref{sec:pkg:kpp}).
 %
 \end{itemize}
-(see Section \ref{sect:buildingCode}).
+(see Section \ref{sec:buildingCode}).
 
 Parts of the SHELFICE code can be enabled or disabled at compile time
 via CPP preprocessor flags. These options are set
 \code{SHELFICE\_OPTIONS.h}.
 Table \ref{tab:pkg:shelfice:cpp} summarizes these options.
 
-\begin{table}[h!]
+\begin{table}[!ht]
 \centering
   \label{tab:pkg:shelfice:cpp}
   {\footnotesize
@@ -94,13 +94,13 @@
 ~ \\
 %
 A package is switched on/off at run-time by setting
-(e.g. for SHELFICE) \code{useSHELFICE = .TRUE.} in \code{data.pkg}.
+(e.g.\ for SHELFICE) \code{useSHELFICE = .TRUE.} in \code{data.pkg}.
 
 \paragraph{General flags and parameters}
 ~ \\
 %
 Table~\ref{tab:pkg:shelfice:runtimeparms} lists all run-time parameters.
-\begin{table}[h!]
+\begin{table}[!ht]
   \caption{Run-time parameters and default values
     \label{tab:pkg:shelfice:runtimeparms}}
   {\footnotesize
@@ -137,7 +137,7 @@
       &  %---ref---
       \\
       SHELFICEHeatCapacity\_Cp & 2000.0E+00
-      &   latent heat of fusion ($c_{p,I}$)
+      &   specific heat capacity of ice ($c_{p,I}$)
       &  %---ref---
       \\
       rhoShelfIce              &  917.0E+00
@@ -407,7 +407,7 @@
 \begin{equation}
   \label{eq:helmerfreeze}
     T_{f} = (0.0901 - 0.0575\ S_{b})^{\circ}
-    - 7.61 \times 10^{-4}\frac{^{\circ}}{\text{dBar}}\ p_{b} 
+    - 7.61 \times 10^{-4}\frac{\text{K}}{\text{dBar}}\ p_{b} 
 \end{equation}
 with the salinity $S_{b}$ and the pressure $p_{b}$ (in dBar) in the
 cell at the ice-water interface. From the salt budget, the salt flux
@@ -522,7 +522,7 @@
 C | | |-EXTERNAL_FORCING_T :: Problem specific forcing for temperature.
 C | | |-SHELFICE_FORCING_T :: apply heat fluxes from ice shelf model
 C ...
-C | | |-EXTERNAL_FORCING_S :: Problem specific forcing for temperature.
+C | | |-EXTERNAL_FORCING_S :: Problem specific forcing for salinity.
 C | | |-SHELFICE_FORCING_S :: apply fresh water fluxes from ice shelf model
 C ...
 C | |-DYNAMICS             :: Momentum equations driver.
@@ -552,7 +552,7 @@
 Available output fields are summarized in 
 Table \ref{tab:pkg:shelfice:diagnostics}.
 
-\begin{table}[h!]
+\begin{table}[!ht]
 \centering
 \label{tab:pkg:shelfice:diagnostics}
 {\footnotesize
@@ -586,5 +586,5 @@
 
 %%% Local Variables: 
 %%% mode: latex
-%%% TeX-master: "../manual"
+%%% TeX-master: "../../manual"
 %%% End: 
