--- manual/s_phys_pkgs/text/shap-parms.tex	2006/04/24 21:16:58	1.1
+++ manual/s_phys_pkgs/text/shap-parms.tex	2010/07/26 15:27:37	1.2
@@ -1,7 +1,7 @@
-\newpage
+%\newpage
 
-\begin{table}
-\hspace*{-1.5in}
+\begin{table}[ht!]
+\hspace*{-0.5cm}
 \begin{tabular}{lllc}
 
   \textbf{Name}  &  \textbf{Default value}  
@@ -32,27 +32,27 @@
     &   power of physical-space filter (Momentum) 
     &  %---ref---
     \\
-   Shap\_Trtau   &                   5.400000000000000E+03
+   Shap\_Trtau   &                   5.4E+03
     &   time scale of Shapiro filter (Tracer) 
     &  %---ref---
     \\
-   Shap\_TrLength   &                   0.000000000000000E+00
+   Shap\_TrLength   &                   0.0E+00
     &   Length scale of Shapiro filter (Tracer) 
     &  %---ref---
     \\
-   Shap\_uvtau   &                   1.800000000000000E+03
+   Shap\_uvtau   &                   1.8E+03
     &   time scale of Shapiro filter (Momentum) 
     &  %---ref---
     \\
-   Shap\_uvLength   &                   0.000000000000000E+00
+   Shap\_uvLength   &                   0.0E+00
     &   Length scale of Shapiro filter (Momentum) 
     &  %---ref---
     \\
-   Shap\_noSlip   &                   0.000000000000000E+00
+   Shap\_noSlip   &                   0.0E+00
     &   No-slip parameter (0=Free-slip ; 1=No-slip)
     &  %---ref---
     \\
-   Shap\_diagFreq   &                   0.000000000000000E+00
+   Shap\_diagFreq   &                   0.0E+00
     &   $Frequency^-1$ for diagnostic output (s)
     &  %---ref---
     \\
