--- manual/s_phys_pkgs/text/seaice-parms.tex	2009/05/13 12:53:33	1.4
+++ manual/s_phys_pkgs/text/seaice-parms.tex	2010/08/30 23:09:21	1.5
@@ -1,5 +1,5 @@
 
-\begin{table}[h!]
+\begin{table}[!ht]
 \caption{Run-time parameters and default values
 \label{tab:pkg:seaice:runtimeparms}}
 {\footnotesize
