--- manual/s_phys_pkgs/text/packages.tex	2004/02/12 16:40:28	1.3
+++ manual/s_phys_pkgs/text/packages.tex	2004/10/12 18:16:03	1.4
@@ -1,7 +1,11 @@
-% $Header: /home/ubuntu/mnt/e9_copy/manual/s_phys_pkgs/text/packages.tex,v 1.3 2004/02/12 16:40:28 edhill Exp $
+% $Header: /home/ubuntu/mnt/e9_copy/manual/s_phys_pkgs/text/packages.tex,v 1.4 2004/10/12 18:16:03 edhill Exp $
 % $Name:  $
 
 \section{Using MITgcm Packages}
+\label{sec:pkg:using}
+\begin{rawhtml}
+<!-- CMIREDIR:package_using: -->
+\end{rawhtml}
 
 The set of packages that will be used within a partiucular model can
 be configured using a combination of both ``compile--time'' and
