--- manual/s_phys_pkgs/text/gridalt.tex	2009/11/23 21:08:56	1.12
+++ manual/s_phys_pkgs/text/gridalt.tex	2010/08/27 13:15:37	1.13
@@ -44,7 +44,7 @@
 \begin{figure}[htbp]
 \vspace*{-0.4in}
 \begin{center}
-\includegraphics[height=2.4in]{part6/vertical.eps}
+\includegraphics[height=2.4in]{s_phys_pkgs/figs/vertical.eps}
 \caption{Vertical discretization for MITgcm (dark grey lines) and for the
 atmospheric physics (light grey lines). In this implementation, all MITgcm level
 interfaces must coincide with atmospheric physics level interfaces.}
