--- manual/s_phys_pkgs/text/gmredi.tex	2011/10/25 18:52:36	1.17
+++ manual/s_phys_pkgs/text/gmredi.tex	2013/03/26 15:10:46	1.18
@@ -386,7 +386,7 @@
 
 \subsubsection*{Tapering: Large, Danabasoglu and Doney, JPO 1997}
 
-The tapering used in \cite{ldd:97} is based on the
+The tapering used in \cite{lar-eta:97} is based on the
 DM95 tapering scheme, but also tapers the scheme with an additional
 function of height, $f_2(z)$, so that the GM/Redi SGS fluxes are
 reduced near the surface:
