--- manual/s_phys_pkgs/text/fizhi.tex	2004/01/28 21:00:10	1.5
+++ manual/s_phys_pkgs/text/fizhi.tex	2004/10/12 18:16:03	1.7
@@ -1,4 +1,8 @@
 \section{Fizhi: High-end Atmospheric Physics}
+\label{sec:pkg:fizhi}
+\begin{rawhtml}
+<!-- CMIREDIR:package_fizhi: -->
+\end{rawhtml}
 \input{texinputs/epsf.tex}
 
 \subsection{Introduction}
@@ -888,3 +892,8 @@
 the model's moisture data is used.  Above 100 mb, the SAGE data is used.  Between 100 and 300 mb,
 a linear interpolation (in pressure) is performed using the data from SAGE and the GCM. 
 
+\subsection{Key subroutines, parameters and files}
+
+\subsection{Dos and donts}
+
+\subsection{Fizhi Reference}
