--- manual/s_phys_pkgs/text/dic.tex	2008/01/15 22:01:46	1.5
+++ manual/s_phys_pkgs/text/dic.tex	2010/08/30 23:09:21	1.6
@@ -23,7 +23,7 @@
 surface waters. The pH is determined following the
 method of Follows et al. 
 For more details of the equations see section 
-\ref{sect:eg-biogeochem_tutorial}.
+\ref{sec:eg-biogeochem_tutorial}.
 
 \subsubsection {Key subroutines and parameters}
 
@@ -181,6 +181,6 @@
 
 \begin{itemize}
 \item{Global Ocean tutorial, in tutorial\_global\_oce\_biogeo verification directory, 
-described in section \ref{sect:eg-biogeochem_tutorial} }
+described in section \ref{sec:eg-biogeochem_tutorial} }
 \end{itemize}
 
