--- manual/s_phys_pkgs/mdsio.tex	2004/01/29 21:12:31	1.3
+++ manual/s_phys_pkgs/mdsio.tex	2004/10/12 18:16:03	1.4
@@ -1,19 +1,16 @@
-% $Header: /home/ubuntu/mnt/e9_copy/manual/s_phys_pkgs/Attic/mdsio.tex,v 1.3 2004/01/29 21:12:31 edhill Exp $
+% $Header: /home/ubuntu/mnt/e9_copy/manual/s_phys_pkgs/Attic/mdsio.tex,v 1.4 2004/10/12 18:16:03 edhill Exp $
 % $Name:  $
 
 
 \section{MDSIO}
 \label{sec:mdsio}
 \label{sec:pkg:mdsio}
+\begin{rawhtml}
+<!-- CMIREDIR:package_mdsio: -->
+\end{rawhtml}
 
 The \texttt{mdsio} package contains a group of Fortran routines
 intended as a general interface for reading and writing direct-access
 (``binary'') Fortran files.  The \texttt{mdsio} routines are used by
 the \texttt{rw} package.
 
-\subsection{Introduction}
-
-
-
-\subsection{Package Reference}
-
