--- manual/s_outp_pkgs/text/diagnostics.tex	2006/04/18 15:59:40	1.7
+++ manual/s_outp_pkgs/text/diagnostics.tex	2010/08/27 13:16:37	1.8
@@ -398,7 +398,7 @@
      I          diagName, diagCode, diagUnits, diagTitle, myThid ) 
 \end{verbatim}
 
-\input{part7/diagnostics-menu.tex}
+\input{s_outp_pkgs/text/diagnostics-menu.tex}
 
 \newpage
 \noindent For a list of the diagnostic fields available in the
