--- manual/s_outp_pkgs/text/diagnostics.tex	2011/06/14 00:16:23	1.10
+++ manual/s_outp_pkgs/text/diagnostics.tex	2013/06/12 22:26:48	1.12
@@ -132,7 +132,7 @@
      where all the arguments are the same as for DIAGNOSTICS_FILL with
      the addition of:
         scaleFact   = Scaling factor to apply to the input field product
-        power       = Integer power to which to raise the input field (before scaling)
+        power       = Integer power to which to raise the input field (after scaling)
 \end{verbatim}
 
 \noindent
@@ -380,7 +380,7 @@
    levels(1:5,1) = 1.,2.,3.,4.,5.,
    filename(1) = 'diagout1',
   frequency(1) = 86400.,
-  fields(1:3,2) = 'THETA   ','SALT    ',
+  fields(1:2,2) = 'THETA   ','SALT    ',
    filename(2) = 'diagout2',
   fileflags(2) = ' P1     ',
   frequency(2) = 3600.,
