--- manual/s_outp_pkgs/text/diagnostics.tex	2011/06/14 00:16:23	1.10
+++ manual/s_outp_pkgs/text/diagnostics.tex	2011/06/21 17:52:37	1.11
@@ -132,7 +132,7 @@
      where all the arguments are the same as for DIAGNOSTICS_FILL with
      the addition of:
         scaleFact   = Scaling factor to apply to the input field product
-        power       = Integer power to which to raise the input field (before scaling)
+        power       = Integer power to which to raise the input field (after scaling)
 \end{verbatim}
 
 \noindent
