--- manual/s_getstarted/text/customization.tex	2004/10/14 14:54:24	1.2
+++ manual/s_getstarted/text/customization.tex	2006/04/15 14:43:59	1.5
@@ -1,4 +1,8 @@
 \section[Customizing MITgcm]{Doing it yourself: customizing the code}
+\label{sect:customize}
+\begin{rawhtml}
+<!-- CMIREDIR:customizing_mitgcm: -->
+\end{rawhtml}
 
 When you are ready to run the model in the configuration you want, the
 easiest thing is to use and adapt the setup of the case studies
@@ -634,9 +638,8 @@
   set to \texttt{'.FALSE.'}, free-slip boundary conditions are
   applied. If no-slip boundary conditions are applied at the bottom, a
   bottom drag can be applied as well. Two forms are available: linear
-  (set the variable \textbf{bottomDragLinear} in s$ ^{-1}$) and
-  quadratic (set the variable \textbf{bottomDragQuadratic} in
-  m$^{-1}$).
+  (set the variable \textbf{bottomDragLinear} in m/s) and
+  quadratic (set the variable \textbf{bottomDragQuadratic}, dimensionless).
 
   The Fourier and Shapiro filters are described elsewhere.
 
