--- manual/s_examples/rotating_tank/tank.tex	2006/04/08 01:50:50	1.14
+++ manual/s_examples/rotating_tank/tank.tex	2010/08/27 13:25:32	1.17
@@ -1,4 +1,4 @@
-% $Header: /home/ubuntu/mnt/e9_copy/manual/s_examples/rotating_tank/tank.tex,v 1.14 2006/04/08 01:50:50 edhill Exp $
+% $Header: /home/ubuntu/mnt/e9_copy/manual/s_examples/rotating_tank/tank.tex,v 1.17 2010/08/27 13:25:32 jmc Exp $
 % $Name:  $
 
 \bodytext{bgcolor="#FFFFFFFF"}
@@ -19,11 +19,9 @@
 \begin{rawhtml}
 <!-- CMIREDIR:eg-tank: -->
 \end{rawhtml}
-
-This section illustrates an example of MITgcm simulating a laboratory
-experiment on much smaller scales than those commonly considered in  
-geophysical
-fluid dynamics.
+\begin{center}
+(in directory: {\it verification/rotating\_tank/})
+\end{center}
 
 \subsection{Overview}
 \label{www:tutorials}
@@ -34,7 +32,8 @@
 on a $3^{\circ}\times1\mathrm{cm}$ cyclindrical grid with twenty-nine
 vertical levels of 0.5cm each.  This is a typical laboratory setup for
 illustration principles of GFD, as well as for a laboratory data
-assimilation project.
+assimilation project. The files for this experiment can be found in
+the verification directory under rotating\_tank.
 \\
 
 example illustration from GFD lab here
@@ -227,7 +226,7 @@
 notes.
 
 \begin{small}
-\input{part3/case_studies/rotating_tank/input/data}
+\input{s_examples/rotating_tank/input/data}
 \end{small}
 
 \subsubsection{File {\it input/data.pkg}}
@@ -280,7 +279,7 @@
 \end{itemize}
 
 \begin{small}
-\input{part3/case_studies/rotating_tank/code/SIZE.h}
+\input{s_examples/rotating_tank/code/SIZE.h}
 \end{small}
 
 \subsubsection{File {\it code/CPP\_OPTIONS.h}}
