--- MITgcm_contrib/bbl/input.bbl/data.bbl	2013/08/27 21:02:21	1.2
+++ MITgcm_contrib/bbl/input.bbl/data.bbl	2013/09/01 20:21:39	1.3
@@ -1,7 +1,7 @@
 # BBL runtime parameters
  &BBL_PARM01
- bbl_wvel      = 1.D-7
- bbl_hvel      = 1.D-1
+ bbl_wvel      = 1.D-5
+ bbl_hvel      = 1.D0
  bbl_initEta   = 20.D0
  bbl_thetaFile = ' '
  bbl_saltFile  = ' '
