%%
%%  $Header: /home/ubuntu/mnt/e9_copy/MITgcm/pkg/mypackage/mypackage_description.tex,v 1.1 2006/06/28 21:26:21 heimbach Exp $
%%  $Name: checkpoint63a $
%%

Package ``MYPACKAGE'' is a template for implementing a new package.
It shows how, ideally, the package should interact with the
MITgcm kernel on various levels (initialisation, time-stepping,
post-processing).
